From 8d759b8d5c66f91029da3544b634e5f6c7335994 Mon Sep 17 00:00:00 2001
From: Furkan Sahin <furkan-dev@proton.me>
Date: Sun, 26 Jun 2022 18:07:11 -0500
Subject: Use viewport (vh or vw) rather than percent (percent of parent
 container)

---
 src/App.svelte | 5 +++--
 1 file changed, 3 insertions(+), 2 deletions(-)

(limited to 'src/App.svelte')

diff --git a/src/App.svelte b/src/App.svelte
index d2765c4..a9084c4 100644
--- a/src/App.svelte
+++ b/src/App.svelte
@@ -46,7 +46,8 @@
 			border-bottom-color: rgb(148 163 184);
 			border-bottom-width: 4px;
 			text-align: center;
-			height: 10%;
+			/* height: 9%; */
+			height: 10vh;
 			overflow: hidden;
 			flex: none;
 		}
@@ -55,7 +56,7 @@
 			/* flex-direction: row; */
 			flex: 1 1 auto;
 			overflow-y: auto;
-			/* height: 100%; */
+			height: 100%;
 		}
 	}
 </style>
-- 
cgit v1.2.3

