From 71aa00038a4dfecaaef85bfa72cdcabdd35d80dd Mon Sep 17 00:00:00 2001
From: Furkan Sahin <furkan-dev@proton.me>
Date: Sun, 7 Aug 2022 12:32:46 -0500
Subject: Table head row is frozen/stickied to the top of the page now

---
 src/components/Labs.svelte | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/Labs.svelte')

diff --git a/src/components/Labs.svelte b/src/components/Labs.svelte
index f794e94..bddf607 100644
--- a/src/components/Labs.svelte
+++ b/src/components/Labs.svelte
@@ -68,7 +68,7 @@
 <div class="overflow-auto h-full">
   <table class="table w-full">
     <!-- head -->
-    <thead>
+    <thead class="sticky top-0">
       <tr>
         {#each headers as header, i}
           {#if i == 0}
-- 
cgit v1.2.3

