From b1157ba0a39e0993fb70d0ce02ef3bb924745413 Mon Sep 17 00:00:00 2001
From: Furkan Sahin <furkan-dev@proton.me>
Date: Tue, 9 Aug 2022 18:47:55 -0500
Subject: `bugfix`  Remove height from table

Head row shifted to middle of page when num pts = 0
---
 src/components/PeerTeachers.svelte | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/components/PeerTeachers.svelte')

diff --git a/src/components/PeerTeachers.svelte b/src/components/PeerTeachers.svelte
index 6aa7b5f..6081638 100644
--- a/src/components/PeerTeachers.svelte
+++ b/src/components/PeerTeachers.svelte
@@ -56,8 +56,8 @@
   ];
 </script>
 
-<div class="h-full overflow-auto">
-  <table class="table table-compact w-full h-full">
+<div class="overflow-auto h-full">
+  <table class="table w-full table-compact">
     <thead class="sticky top-0">
       <tr>
         {#each headers as header, i}
-- 
cgit v1.2.3

