From fc95de77de5ef1b34150f40555fb380c99bc3b36 Mon Sep 17 00:00:00 2001
From: Furkan Sahin <furkan-dev@proton.me>
Date: Tue, 19 Jul 2022 16:32:26 -0400
Subject: sidebar should not be flexing

---
 src/components/Sidebar.svelte | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/Sidebar.svelte')

diff --git a/src/components/Sidebar.svelte b/src/components/Sidebar.svelte
index 92f6427..b37d175 100644
--- a/src/components/Sidebar.svelte
+++ b/src/components/Sidebar.svelte
@@ -33,7 +33,7 @@
 <!-- Entire Page -->
 <div class="flex flex-row h-screen">
   <!-- SIDEBAR -->
-  <div class="w-2/12 flex flex-col border-r">
+  <div class="flex-none w-2/12 flex-col border-r">
     <!-- Header for sidebar sections -->
     <div
       class="font-serif flex-none text-center text-2xl text-neutral-900 p-4 border-b font-black overflow-hidden"
-- 
cgit v1.2.3

