From 3e9a18c412acf28ea5a23d686244c77e4342bd68 Mon Sep 17 00:00:00 2001
From: Furkan Sahin <furkan-dev@proton.me>
Date: Sat, 16 Jul 2022 00:34:57 -0400
Subject: default click handler changed

---
 src/components/helpers/Icon.svelte | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/helpers/Icon.svelte')

diff --git a/src/components/helpers/Icon.svelte b/src/components/helpers/Icon.svelte
index 8dc2a89..e7b68d6 100644
--- a/src/components/helpers/Icon.svelte
+++ b/src/components/helpers/Icon.svelte
@@ -4,7 +4,7 @@
   export let height = "1rem";
   export let focusable = "false";
   export let handleClick = () => {
-    console.log("Default on:click handler for Icon.svelte. No handler passed");
+    console.log(`No click handler passed to icon "${name}"`);
   };
   let icons = [
     {
-- 
cgit v1.2.3

