From 62705aefd79764b00f86bdfd16188fdec81c8b76 Mon Sep 17 00:00:00 2001
From: Furkan Sahin <furkan-dev@proton.me>
Date: Sat, 16 Jul 2022 00:20:01 -0400
Subject: Successfully adding/removing labs from PeerTeachers; however need to
 bugfix the icon always showing a minus-circle along with the bottom
 unassigned-labs sections not updating

---
 src/components/helpers/Icon.svelte | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/helpers/Icon.svelte')

diff --git a/src/components/helpers/Icon.svelte b/src/components/helpers/Icon.svelte
index c9154f3..8dc2a89 100644
--- a/src/components/helpers/Icon.svelte
+++ b/src/components/helpers/Icon.svelte
@@ -4,7 +4,7 @@
   export let height = "1rem";
   export let focusable = "false";
   export let handleClick = () => {
-    console.log("Default icon on:click function prints this");
+    console.log("Default on:click handler for Icon.svelte. No handler passed");
   };
   let icons = [
     {
-- 
cgit v1.2.3

